-- Table: public.Auftraggebers

-- DROP TABLE IF EXISTS public."Auftraggebers";

CREATE TABLE IF NOT EXISTS public."Auftraggebers"
(
    "Id" integer NOT NULL GENERATED BY DEFAULT AS IDENTITY ( INCREMENT 1 START 1 MINVALUE 1 MAXVALUE 2147483647 CACHE 1 ),
    "Name" text COLLATE pg_catalog."default",
    "Strasse" text COLLATE pg_catalog."default",
    "Ort" text COLLATE pg_catalog."default",
    "Postleitzahl" text COLLATE pg_catalog."default",
    "Ansprechpartner" text COLLATE pg_catalog."default",
    "Telefonnummer" text COLLATE pg_catalog."default",
    CONSTRAINT "PK_Auftraggebers" PRIMARY KEY ("Id")
)

TABLESPACE pg_default;

ALTER TABLE IF EXISTS public."Auftraggebers"
    OWNER to "SewerGen";